---
displayed_sidebar: homepage
---

import TypeList from "@site/src/components/TypeList"

# AdminGetBatchPaginationParams

Request parameters used to configure and paginate retrieved batch jobs.

## Properties

<TypeList types={[{"name":"limit","type":"`number`","description":"Limit the number of items returned in the list.","optional":false,"defaultValue":"10","expandable":false,"children":[]},{"name":"offset","type":"`number`","description":"The number of items to skip when retrieving a list.","optional":false,"defaultValue":"0","expandable":false,"children":[]},{"name":"expand","type":"`string`","description":"Comma-separated relations that should be expanded in the returned data.","optional":true,"defaultValue":"","expandable":false,"children":[]},{"name":"fields","type":"`string`","description":"Comma-separated fields that should be included in the returned data.","optional":true,"defaultValue":"","expandable":false,"children":[]},{"name":"order","type":"`string`","description":"The field to sort the data by. By default, the sort order is ascending. To change the order to descending, prefix the field name with `-`.","optional":true,"defaultValue":"","expandable":false,"children":[]}]} expandUrl="https://docs.medusajs.com/development/entities/repositories#retrieving-a-list-of-records" sectionTitle="AdminGetBatchPaginationParams"/>
