---
displayed_sidebar: homepage
---

import ParameterTypes from "@site/src/components/ParameterTypes"

# HttpCompressionOptions

HTTP compression configurations.

## Properties

<ParameterTypes parameters={[{"name":"enabled","type":"`boolean`","description":"Whether HTTP compression is enabled. By default, it's `false`.","optional":true,"defaultValue":"","expandable":false,"children":[]},{"name":"level","type":"`number`","description":"The level of zlib compression to apply to responses. A higher level will result in better compression but will take longer to complete.\nA lower level will result in less compression but will be much faster. The default value is `6`.","optional":true,"defaultValue":"","expandable":false,"children":[]},{"name":"memLevel","type":"`number`","description":"How much memory should be allocated to the internal compression state. It's an integer in the range of 1 (minimum level) and 9 (maximum level).\nThe default value is `8`.","optional":true,"defaultValue":"","expandable":false,"children":[]},{"name":"threshold","type":"`string` \\| `number`","description":"The minimum response body size that compression is applied on. Its value can be the number of bytes or any string accepted by the\n[bytes](https://www.npmjs.com/package/bytes) module. The default value is `1024`.","optional":true,"defaultValue":"","expandable":false,"children":[]}]} expandUrl="https://docs.medusajs.com/development/entities/repositories#retrieving-a-list-of-records" sectionTitle="HttpCompressionOptions"/>
