---
displayed_sidebar: homepage
---

import ParameterTypes from "@site/src/components/ParameterTypes"

# RequestQueryFields

Request parameters used to configure and paginate retrieved data.

## Properties

<ParameterTypes parameters={[
  {
    "name": "expand",
    "type": "`string`",
    "description": "Comma-separated relations that should be expanded in the returned data.",
    "optional": true,
    "defaultValue": "",
    "expandable": false,
    "children": []
  },
  {
    "name": "fields",
    "type": "`string`",
    "description": "Comma-separated fields that should be included in the returned data.",
    "optional": true,
    "defaultValue": "",
    "expandable": false,
    "children": []
  },
  {
    "name": "limit",
    "type": "`number`",
    "description": "Limit the number of items returned in the list.",
    "optional": true,
    "defaultValue": "",
    "expandable": false,
    "children": []
  },
  {
    "name": "offset",
    "type": "`number`",
    "description": "The number of items to skip when retrieving a list.",
    "optional": true,
    "defaultValue": "",
    "expandable": false,
    "children": []
  },
  {
    "name": "order",
    "type": "`string`",
    "description": "The field to sort the data by. By default, the sort order is ascending. To change the order to descending, prefix the field name with `-`.",
    "optional": true,
    "defaultValue": "",
    "expandable": false,
    "children": []
  }
]} expandUrl="https://docs.medusajs.com/development/entities/repositories#retrieving-a-list-of-records"/>
